30 30

31 31

32 32

33 33

34 34

35 35

36 36

37 37

120

120

119

119

118

118

117

117

116

116

115

115

114

114

113

113 Nevada Test Site ∗ Anza Seismic Gap

10 km

F3

F2 F1 ∗ ∗ ∗ ∗∗

∗

∗

∗

∗

∗

∗

∗ ∗ ∗

∗ ∗

∗ ∗ ∗

∗ ∗

∗ ∗

∗ ∗ ∗ ∗ ∗ ∗

∗

∗ ∗

∗

∗

∗

∗

∗ ∗

∗

∗

∗∗ ∗ ∗

∗

∗ ∗

∗

∗ ∗

∗

∗ ∗ ∗

∗ ∗

∗

∗∗∗

∗

∗

∗

∗

∗

∗ ∗ ∗ ∗

∗

∗ ∗

∗

∗

∗∗∗

∗ ∗

∗∗

∗

∗

∗

∗ ∗

∗

∗

PFO

Salton Sea

Palm Springs

San Andreas fault zone

San Jacinto fault zone

Elsinore fault zone

∗^{- 1991 events}

Broadband Array Geometry

E-ring

D-ring

C-ring

East

North

1 km

A-ring B-ring C-ring D-ring E-ring

~ ~ ~ ~ ~

150m 320m 735m 1480m 3000m