Appendix A - List of Events

Following is a list of the 645 events that were located and/or associated at CNET for the period of January 1, 1992 to November 9, 1992. The column labeled evid refers to the event id number and is unique for each physical event. The column labeled orid refers to the origin id number and is unique for each hypocenter solution either from CNET locations or from the USGS PDE catalog. Hypocenter solutions for the same physical event are grouped together with different orid values and the same evid value. Hypocenter authors are indicated by the auth column. The column labeled nstas refers to the number of CNET stations that were used in a location or which had arrivals that associated with the PDE catalog. The column labeled nass refers to the number of phases either used in a location or were associated with a PDE event.

A-1A-2A-3A-4A-5A-6A-7A-8A-9A-10

A-11

A-12

A-13

A-14

A-15

A-16

A-17