130˚W

130˚W

120˚W

120˚W

110˚W

110˚W

100˚W

100˚W

30˚N

30˚N

40˚N

40˚N

50˚N

50˚N

60˚N

60˚N

Great Slave Lake

Fort Simpson

Calgary

Edmonton

Denver

Albuquerque

Salt Lake City

El Paso

SP61

SP57 SP55

SP49

SP43

SP37

SP33

Figure 1: Map of experimental layout with topography and state boundaries. The blue line shows the receiver array, with stars marking shotpoints.