130˚W

120˚W

110˚W

100˚W

30˚N

40˚N

50˚N

60˚N

CB

VS

Wyoming

Archean

Hearne

Proterozoic

Colorado Plateau

Basin & Range

Figure 2: Experimental layout with boundaries between the main tectonic elements

sampled in the experiment. VS: Vulcan structure, CB, Cheyenne belt.