Time - Range / 8 (sec)

0 0

10 10

20 20

30 30

40 40

50 50

60 60

0 1 2 3 4 5 6 7

9 10 11 12

13 14 15 16 17 18 19 20 21 22 23 24

26 27 28 29

31

agate-2-8-v

chan chan

-50 0 50 100 150 200 250 Range (km)