0 0.02 0.04 0.06 0.08 0.10 0.12 0.14 approximate depth (km)

30.0

30.5

31.0

31.5

32.0

32.5

33.0

33.5

34.0

34.5

35.0

35.5

36.0

36.5

37.0

Carr Inlet, Washington; sparker, line 7 v.e. ~ 8.0